
		SYSTEM STATUS--SYSTAT

	To get a picture of the system status Type: SY

	The following options are available:

	
	/A		Report only status of attached jobs

	/B		Report only busy device status

	/D		Report only disk status

	/F		Report only free buffer status

	/Kn		Report only job status of terminal n in system.

	/N		Report only status of non-privileged accounts.
	
	/n		Report status of job n only.

	/n,m		Report status of account [n,m] only.

	/n,*		Report status of jobs with project n only.

	/P		Report only status of Privileged accounts.

	/R		Report only run-time system statistics

	/S		Report only job status

	/U		Report only status of unattached jobs.

	/0,0		Report only status of jobs not logged into system.

	Note:  a - sign may be included with any option, in any position
	following the slash, to cause printing of an account number instead
	of [OPR] and [SELF].
